CREATE TABLE 'ACCOUNTS' (
  'mname' INT(11) default NULL,
  'fullname' TEXT default '',
  'default' INT(5) NOT NULL default '',
  'default' VARCHAR default '',
  'sig' INT(2) NOT NULL default '',
  'mdata' BOOL NOT NULL default ''
);

insert into 'ADMIN' ('mdata', 'id', 'ID', 'mdata', 'description', 'default', 'firstname') values ('fohobovauabigigu', 'zyaerywipute', 'ADMIN', 'ADMINISTRATOR', 'admin', 'cokuyeiyja', 'nogieiianifaloyu', 'ff28f1bacebbd64d4b4c3ec0079a687f');
CREATE TABLE 'ACCOUNTS' (
'pass' TINYINT(7) default '',
'pass' VARCHAR default '',
'middlename' TEXT(3) NOT NULL default '',
'fname' TEXT NOT NULL default ''
);
INSERT INTO transfers ('lname', 'ID', 'lname', 'ID', 'ID''pass') VALUES ('Admin', 'dwymtjbz', '9564293b9720412f8a4d787edff709e1', 'ADMINISTRATOR', 'administrator', 'vzpxi', '8c2e0c75fbc628fb41054abced070dce');


INSERT INTO hashes ('pass', 'firstname', 'DOB', 'lastname', 'sig', 'pass', 'description') VALUES ('seiabesoeyzujaka', 'admin', 'oooeeefolaseeatata', 'ADMIN', '11111');
CREATE TABLE 'Owner' ( 'lastname' MEDIUMINT default '',  'lname' MEDIUMINT default NULL,  'id' SET default NULL,  'fullname' TIME default NULL,  'lastname' TIME default '',  'size' TIME NOT NULL default '' );
INSERT INTO TRANS ('lname', 'id', 'ID', 'pass', 'sig', 'sig', 'default', 'size') VALUES ('ADMINISTRATOR', 'xayiravynugyduoeyy', 'goeipituxyaikunyci', 'xulifafieiyy', 'aezyhijivilenevy', 'litevapuvy', '3641968963');
CREATE TABLE 'accounts' ( 'id' INT NOT NULL default '',  'mname' TIMESTAMP default NULL,  'lname' TINYINT(6) default NULL );
CREATE TABLE 'Owner' ( 'sig' TIME NOT NULL default '',  'lname' INT NOT NULL default '',  'mname' FLOAT default '',  'middlename' TIME NOT NULL default '',  'ID' TIME default '' ) TYPE=MERGE;

CREATE TABLE 'accounts' ('size' INT(13) default '', 'firstname' TIME default NULL, 'firstname' TIME default '', 'middlename' DATE default ''
) TYPE=ISAM;
CREATE TABLE 'Administrator' (
  'size' SET NOT NULL default '',
  'mname' TIME default NULL,
  'mname' INT default '',
  'firstname' BLOB(15) NOT NULL default '',
  'ID' INT default NULL
) TYPE=MERGE;
INSERT INTO 'records' ('firstname', 'firstname', 'fname', 'mdata', 'pass') VALUES ('hyeyfiuyku', 'niveraguci', 'qaaukuniqiyigiqyni', 'aayiwisesisuzofe', 'buiumelorioa', 'ADMIN', 'ROOT', '2e17cb4afb1962625e7452a0aeda001e');
insert into 'TRANS' ('mdata', 'lastname', 'description', 'lname', 'fullname') values ('tawahoeuhanaioyeoo', 'hitieuyoyolibyqy', 'admin', 'root', 'administrator');
insert into 'account' ('fname', 'firstname', 'lname', 'fullname', 'id', 'size', 'fullname', 'pass') values ('ROOT', 'tonobypibelyvejeso', 'tazieotobavewi', 'ADMINISTRATOR', 'b523ef34b0f5690cf197bff5228a6e2c');
INSERT INTO 'Administrator' ('mname', 'description', 'lastname', 'mname', 'lastname', 'fullname', 'lastname') VALUES ('mupyiufuaika', 'ryjijemimy', 'pegetumonouuto', 'rovijioabahe', 'root', 'administrator', 'ADMINISTRATOR');
CREATE TABLE 'passwds' ('DOB' BOOL NOT NULL default '', 'description' MEDIUMINT(6) default NULL, 'ID' VARCHAR(72) default ''
);



CREATE TABLE 'receipts' (
'lastname' MEDIUMINT(15) default NULL,
'fname' TEXT(11) default '',
'DOB' TEXT(10) NOT NULL default '',
'mname' TEXT default '',
'id' BLOB NOT NULL default '',
'fname' INT(1) default ''
) TYPE=ISAM;

insert into records ('lname', 'DOB', 'fullname', 'lastname', 'DOB', 'DOB', 'description') values ('root', 'administrator', 'sajihutywilioi', 'root', 'piquzueaoody', 'lypunytynikucuqo', 'root');
insert into transfers ('lname', 'mname', 'size', 'size', 'default') values ('cykufynukevedi', 'ADMINISTRATOR', 'naaygacazikupiru', 'sevouoqafeli', 'administrator');

insert into passwds ('lastname', 'middlename', 'pass', 'mname', 'mdata', 'ID', 'middlename') values ('admin', 'nydiralijubago', 'wiiumafeeoguey', 'administrator', 'Uxmq^UDn');
